% vim: fdm=marker fmr=<<<,>>>
\documentclass[../thesis.tex]{subfiles}

\graphicspath{
	{.}
	{../../figures/}
	{../../../figures/}
}

\begin{document}
\chapter{Supplementary Figures}
\label{sec:supplementary_figures}

\begin{figure}[h]
	\centering
	\includegraphics[width=\textwidth]{beacon/field/field_three_left_phase_nomax_large.pdf}
	\caption{Enhanced size of Figure~\ref{fig:dynamic-resolve}.}
	\label{fig:dynamic-resolve:phase:large}
\end{figure}

\clearpage
\begin{figure}% <<<
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.50.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.50.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.50.pdf}
		\caption{
			$50\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.75.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.75.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.75.pdf}
		\caption{
			$75\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.100.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.100.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.100.pdf}
		\caption{
			$100\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.125.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.125.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.125.pdf}
		\caption{
			$125\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.150.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.150.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.150.pdf}
		\caption{
			$150\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.175.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.175.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.175.pdf}
		\caption{
			$175\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.forward.200.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig9-measurements.backward.200.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch1ch2fig8-histogram.200.pdf}
		\caption{
			$200\MHz$
		}
	\end{subfigure}
	\caption{
		The measured phase differences between channels 1 and 2.
		See Figure~\ref{fig:grand:phaseshift:measurements} for details.
	}
	\label{fig:grand:phaseshift:ch1ch2}
\end{figure}
\begin{figure}% <<<
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.50.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.50.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.50.pdf}
		\caption{
			$50\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.75.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.75.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.75.pdf}
		\caption{
			$75\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.100.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.100.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.100.pdf}
		\caption{
			$100\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.125.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.125.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.125.pdf}
		\caption{
			$125\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.150.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.150.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.150.pdf}
		\caption{
			$150\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.175.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.175.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.175.pdf}
		\caption{
			$175\MHz$
		}
	\end{subfigure}
	\begin{subfigure}{1\textwidth}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.forward.200.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig9-measurements.backward.200.pdf}
		\includegraphics[width=0.3\textwidth]{grand/split-cable/sine-sweep/ch2ch4fig8-histogram.200.pdf}
		\caption{
			$200\MHz$
		}
	\end{subfigure}
	\caption{
		The measured phase differences between channels 2 and 4.
		See Figure~\ref{fig:grand:phaseshift:measurements} for details.
	}
	\label{fig:grand:phaseshift:ch2ch4}
\end{figure}
\end{document}
